:*:
    Change user parameters
+------------------------------------+
! C .. change your City              !
! P .. change your Password          !
! H .. change your Helplevel         !
! I .. change your Informationlevel  !
! N .. number of Nulls after linefeed!
! M .. toggle 'More [Y/n]?' status   !
! T .. toggle the use of Tabs        !
! W .. change your screenWidth       !
! L .. change number of lines/screen !
! Q .. back to main menu             !
+------------------------------------+
!  some commands may be unavailable  !
+------------------------------------+
:?:
For extended help:
press the first character of the function immediately follow by ?.
:C:
City - With this command the city you are calling from can be changed.
:P:
Password - This command changes the password you are using on this system.
           The system will ask for the old password. Then your new password
           must be entered twice.
:H:
Helplevel - This command asks for the helplevel. The helplevel is used for
            menus. An idication:
              1) Full help, valid commands are listed.
              2) Normal help, first characters of valid commands are listed.
              3) No help, only the prompt is shown.
:I:
Info - This command changes the informationlevel. This is used when
       logging on. The information displayed:
        1) Special welcome and bulletin.
        2) Special welcome
        3) Bulletin
        4) Nothing at all.
          *** recommendation: take at least a look at the bulletin. Recent
              changes, important information etc. are listed in this file.
:N:
Nuls - This command asks for the number of nulls to be transmitted after
       a linefeed. This is usual zero but for slow terminals an other
       number may-be better. (The valid range is 0 - 3.)
:M:
More - Toggle the use of [More]. If selected Pandora will ask whether you
       want to continue displaying the current information after a certain
       number of lines.
:T:
Tabs - Toggle the use of tabs. If not selected Pandora will change every
       tab in a certain number of spaces.
:W:
Width - Asks for the  number of columns on your screen.
        (Range 20 - 132)
:L:
Length - Asks for the number of lines on your screen. Used for [More].
:Q:
Quit - Back to the main menu.
:Z:
