;module-definition file for Windows Unzip DLL -- used by link.exe
LIBRARY WIZUNZ16 ; Library module name

DESCRIPTION 'Windows Info-ZIP UnZip DLL 1.0 by Info-ZIP, Mike White 1996'

CODE  PRELOAD MOVEABLE

DATA  PRELOAD FIXED

HEAPSIZE  14000 ; need heap for buffers
STACKSIZE 10000 ; need plenty of stack

EXPORTS
	 DllProcessZipFiles          ; actual entry point
     LibMain
     GetDllVersion

