                            ┌┬─────────────────┬┐                             
                            ││ FM-Edit: Voices ││                             
                            └┴─────────────────┴┘                             
                                                                              
 Function key usage                                         Mouse             
                                                                              
    F1     - Display this help information.                [Help]             
    F2     - Go to Setup screen.                           [Setup]            
    F3     - Exit program.                                 [Exit]             
    F4     - Save current voice bank to disk file.         [Save]             
    F5     - Load voice bank from disk.                    [Load]             
    F6     - Return to Configurations screen.              [Config]           
    F7     - Play a note (or song).  See general help.     [Play]             
    F8     - Turn off any notes sounding.                  [Quite]            
    PgUp   - Select previous voice bank.                                      
    PgDn   - Select next voice bank.                                          
    Home   - Move to first screen cell (Bank #).                              
    Return - If the current cell is a voice name, go to the Voice             
              Parameters screen to view or edit the voice definition.         
              If a mouse is in use, click to select, then click again         
              to edit.                                                        
    Alt-F2 - Toggle MIDI thru mode (IN sent to OUT),       [Thru]             
              default is on.                                                  
    Alt-F3 - Push to DOS.                                  [Push]             
    Alt-F7 - Load standard MIDI file.                      [MFF]              
    Alt-F8 - Set song position.                            [Pos]              
                                                                              
                                                                              
 This screen permits rapid scanning and selection of the available            
 instrument voices.  Moving to a particular voice will select that voice      
 for the current instrument in the current configuration.  The current        
 instrument depends on which instrument column was last selected on the       
 configuration screen.  If the configuration is read-only, the voice change   
 is only temporary while on this screen; otherwise, any voice or bank         
 change will be reflected upon returning to the configuration screen.         
 Note: Voice changes may cause, as a side-effect, changes to the              
 configuration LFO settings and instrument voice function data, depending     
 on the instrument definition and whether combine mode is on.                 
                                                                              
 There are 7 available voice banks of 48 voices each.  Banks 1 and 2 are      
 user banks and may be changed as desired.  Banks 3 through 7 are read-only   
 and contain fixed voices.  Initially, banks 1 and 2 are copies of bank 3.    
 For the Music Feature card, changes to the user banks remain in effect       
 until power off, or until the card is reset from the Setup screen.           
 FB-01's have battery backup to retain data when the unit is switched off.    
 Original settings may be restored from the bank files included with          
 FM-Edit.                                                                     
                                                                              
 The current bank is indicated in the upper left.  Entering a new value in    
 this cell will change the selected bank.  If a particular bank has not       
 been accessed since program startup, there will be a slight delay as its     
 data is loaded from the synth.  The "Copy from bank" cell allows the full    
 contents of another bank to be copied into the current bank (assuming it     
 is not read-only).  Single voices may be copied via the Voice parameters     
 screen.  The name of a voice in a user bank may be changed simply by         
 entering a new name when its cell is highlighted.                            
                                                                              
 The first time a voice bank is accessed after program startup, its           
 contents are loaded into program memory.  For user banks 1 and 2, the        
 contents are always obtained from the MFC or FB-01.  The read-only banks     
 (3-7) are loaded from disk if they are present.  This saves the slow         
 loading time from the MFC (or the even slower loading time via MIDI for a    
 FB-01).  If the bank files are not found, loading will always be from the    
 synth; use the Setup screen to define the data directory containing them     
 to allow disk loading.                                                       
                                                                              
                                                                              
                --- Press F1 for general usage information ---                
                                                                              
                                                                              
                                                                              
