                 Next Page

The "Next Page" menu item causes Ghost-
script to display the next page in the
Postscript file.  If the file was opened
using "Open File ...", then pressing <CR>
in the Console Window has the same
effect.

When a PostScript document is displayed
using "Open File ...", there is no way to
return to previous pages, or to skip
ahead without viewing the intervening
pages.  To view individual pages at will,
use the "Open Page ..." menu item.
