                     Device

The "Device ..." menu item is used to set the
current Ghostscript output device. The output
produced by GS will be suitable for printing
on the selected device.  The dialog which is
presented contains a subset of the devices
that Ghostscript knows about.  Select the
desired device and then click on "Apply" or
"Done" to make the selection active.  The
Ghostscript command which sets the device
will appear at the GS> command line.

Which devices the dialog contains can be
changed by editing the configuration file
stgs.rc.  The file format is clear from the
existing entries.  A list of valid entries
for the device dialog can be obtained by
typing "devicenames ==" on the GS command
line.

Note that when a new device is selected,
output file and the resolution will be set to
the default values for the new device.  Any
previous selections for these parameters will
be discarded.
