
(* MAS PARM Definition Module. *)
DEFINITION MODULE MASPARM;
  FROM Portab IMPORT STRING;
  PROCEDURE NextParm(VAR s : STRING): BOOLEAN;
(*Next Parameter. The next parameter from the GEM environement is
placed in string s. If no parameter was found, FALSE is returned
and s is undefined, else TRUE is returned. The separator for the
parameters is the blank character. *)
  END MASPARM.
