DEFINITION Appl; (* SJ  28.1.93 *)

(* Definition of application library.
   Appl.Init and Appl.Exit is done automatically if Appl is imported.
   All AES modules except Form import Appl.
 *)

PROCEDURE Read* (ApId,Length : INTEGER; Buffer : LONGINT);

PROCEDURE Write* (ApId,Length : INTEGER; Buffer : LONGINT);

PROCEDURE Tplay* (Memory : LONGINT; Number,Scale : INTEGER);

PROCEDURE Trecord* (Memory : LONGINT; Number : INTEGER) : INTEGER;

PROCEDURE Find* (Name : ARRAY OF CHAR) : INTEGER;

END Appl.
