measure : measures area, perimeter and
roundness (p2a)  for all white objects
in a binary image.(store=1: data on disc)
command : bitplane,in-im,out-im,store,file
default :     1   ,  B  ,   C  ,  0  ,
range   :   <1-8> ,<A-D>, <A-D>,<0,1>,
