
Enter a list of tasks, in the sequence that they should be executed.

Each task listed must be a valid task from the list of tasks.

Separate each task with commas:

    EVENT1,EVENT2,EVENT3,EVENT4

.pa

These are the functions performed when the following key is pressed:

F1 - Display Help Screen.

F6 - Accept all event changes.

ESC - Cancel all event changes.

TAB, Enter - Go to Type field.

Shift-TAB  - Go to Time field. If the task is a type 'O' field, go to the
             Interval field.
