<err1    >
 The entry for exposure time must be between 2.0 and 500.0
 seconds.

 [ENTER]  To go back and try again.

<err2    >
 Check the printer for the following problems.

 * Printer is Online?
 * Printer is turned on?
 * Printer cable is attached?
 * Printer has paper loaded?

 [ENTER]  To try again.

<err3    >
 The program will not store this information to the disk
 if the Negative I.D. or the Exposure Time is not included.

 [ENTER]  To go back.

<err4    >
 The program could not find or create the requested data file.

 Check that the Path and File entries are correct.

 [ENTER]  To go back.

<err5    >
 The program could not find the requested Negative I.D.

 Check that the Path, File and Negative I.D. entries are
 correct.

 [ENTER]  To try again.

<err6    >
 There must be an entry in the File Name field.

 [ENTER]  To try again.

<err7    >
 There must be an entey in the Negative I.D. field.

 [ENTER]  To try again.

<err8    >
 If you are entering the Negative Size or the Projection Size.
 The Magnification Factor is calculated from the relationship of
 Projection Size / Negative Size.

 This calculated Magnification Factor or the
 Entered Magnification Factor must result in a value
 between 2.0 and 70.0.

 [ENTER]  To try again.

<err9    >
 The entered value resulted in a calculated Exposure Time
 that was not within the range of this program. The
 calculated Exposure Time must be between 2.0 and 500.0 seconds.

 [ENTER]  To return.

<end>
