       Printer definition file for WSSINDEX custom print utility

All lines of this file are comments until a line beginning ----.  After that,
alternate lines are comments and parameters.  See the CUSTPRNT documentation
for a description of the format allowed here.

Contributed by Art Hurlburt, typed in by RWB.  Since the DEF file was
submitted without a copy of the printer manual, I have made reasonable
guesses as to the meaning of the commands by comparing with other printers.

Commands used in this file:

  27 15 = \e 15 = condensed print (?)
  27 48 = \e \0 = 8 lines per inch (?)
  12 = form feed
------------------------------------------------------------
Printer name
Star NX-1000 (Dip switch 1-6 set to OFF - IBM mode)
Optional string printed on all labels
Property of <your name here>
Printer initialization command for 1,2,... column printing, 50 max

Printer initialization command for labels, 50 max (pitch, line spacing, etc.)
27 15,27 48
Printer initialization command for disk covers, 50 max
27 15,27 48
Printer deinitialization command, 10 max (form feed for laser printer, etc.)
12
Number of spaces in left margin for labels
5
Number of columns for labels
1
Width of labels (characters)
50
Number of characters between labels (if multiple columns)
5
Length of label in lines (including unusable lines)
8
Number of usable lines for label
7
Number of spaces in left margin for disk covers
0
Width of paper for disk covers (characters)
90
Length of page in lines for disk covers
43
Printer command to position for the next disk cover

Character to use for sides of disk cover box (32 = blank prints faster)
179
Character to use for top and bottom lines
196
Character to use for top left corner
218
Character to use for top right corner
191
Character to use for bottom left corner
192
Character to use for bottom right corner
217
End of printer configuration file
