       Printer definition file for WSSINDEX custom print utility

All lines of this file are comments until a line beginning ----.  After that,
alternate lines are comments and parameters.  See the CUSTPRNT documentation
for a description of the format allowed here.
Contributed by Robert W. Murphy, typed in by RWB.

Commands used in this file:

  27 77 = \e M = elite (12 characters per inch)
  27 65 6 = \e A 6 = define 6/72 inch line feed (12 lines per inch)
  27 50 = \e \2 = use line feed size defined by \e A command
  15 = condensed print
  27 83 0 = \e S 0 = superscript mode
  27 65 9 = \e A 9 = define 9/72 inch line feed (8 lines per inch)
  27 64 = \e @ = reset
------------------------------------------------------------
Printer name
Star NP-10 in IBM mode
Optional string printed on all labels
Property of <your name here>
Printer initialization command for 1,2,... column printing, 50 max
27 77
Printer initialization command for labels, 50 max (pitch, line spacing, etc.)
27 65 6 27 50 27 77 15 27 83 0
Printer initialization command for disk covers, 50 max
27 65 9 27 50 15
Printer deinitialization command, 10 max (form feed for laser printer, etc.)
27,64
Number of spaces in left margin for labels
5
Number of columns for labels
1
Width of labels (characters)
50
Number of characters between labels (if multiple columns)
5
Length of label in lines (including unusable lines)
12
Number of usable lines for label
9
Number of spaces in left margin for disk covers
0
Width of paper for disk covers (characters)
82
Length of page in lines for disk covers
40
Printer command to position for the next disk cover
10 10 10 10
Character to use for sides of disk cover box (32 = blank prints faster)
179
Character to use for top and bottom lines
196
Character to use for top left corner
218
Character to use for top right corner
191
Character to use for bottom left corner
192
Character to use for bottom right corner
217
End of printer configuration file
