EXTRAS/SLIDESHOW
================

 Displays all catalogued graphics in form of a slide show.
 A menu appears where the following parameters may be specified:

   - Number of repeats: This slider gadget defines how often all graphics
     ------------------ should be displayed until the slide show should
                        end automatically.
                        With 0 set, the slideshow will run continuously.

   - Delay:             Defines the pause (in seconds) until the next
     ------             graphic is loaded.

   - Order:             The graphics may be displayed in forward, backward
     ------             or random order. Should RANDOM have been selected,
                        the slide show will never end (as if the number
                        of repeats had been specified with "0").



 Note:
 -----

    *  Should the graphic actually be an animation, it will be displayed
       at maximum speed until the next graphic is loaded.

    *  By pressing the left mouse button the slide show may be interrupted
       before the end. It has to be noted that the mouse button must
       be held down until the main screen appears again.


