CATLOG/RENAME
=============

 This function changes the name of the current catalogue.
 It is also possible to change the catalogue description. If a catalogue
 with the same name (as the renamed choice) already exists,
 renaming is not possible.

 Note: This function is not possible with RAMDISK active.




