PROGRAM/QUIT
============

 Leaves PMPro. Should the RAMDISK be active when leaving, the catalogue
 will be erased from it and any changes will be lost. So with an activated
 RAMDISK, select RAMDISK --> CATALOG before exiting. If any changes were
 made the RAMDISK catalogue will be saved.


