##base _QueueBase
##bias 30
*
*   queue.fd --- queue library interface.
*
*   Copyright (c) 1995 SHW Wabnitz
*   Written by Bernhard Fastenrath (fasten@shw.com)
*
*   This file may be distributed under the terms
*   of the GNU General Public License.
*
QOpen(name,mode,sigbit)(a0,d0,d1)
QClose(qh)(a0)
QAddMsg(qh,msg)(a0,a1)
QRemMsg(qh,msg)(a0,a1)
QGetMsg(qh)(a0)
QReplyMsg(qh)(a0)
QFlush(qh)(a0)
##end
