* "ramdrive.device"
##base _RamdriveDevice
##bias 42
##public
*--- functions in V34 or higher (distributed as Release 1.3) ---
KillRAD0()()
*--- functions in V36 or higher (distributed as Release 2.0) ---
KillRAD(unit)(d0)
##end
