U-220 Rhythm / Rhythm Bank
--------------------------

* Rhythm - load the U-20 Rhythm
  setup
* Rhythm Bank - load all four rhythm
  setups

* Match U-20 Unit # to Comm Ch (found
  under EDIT/SETUP/MIDI/COMMON)

* Ensure that Rx System Exclusive
  reception is enabled (found under
  EDIT/SETUP/MIDI)
