U-20 Setup
----------

* Configure all global settings

* Match U-20 Unit # to Comm Ch (found
  under EDIT/SETUP/MIDI/COMMON)

* Ensure that Rx System Exclusive
  reception is enabled (found under
  EDIT/SETUP/MIDI)
