U-20 Chord 1, 2, ChordSet
-------------------------

* load chords 1, 2, and the chord set

* Match U-20 Unit # to Comm Ch (found
  under EDIT/SETUP/MIDI/COMMON)

* Ensure that Rx System Exclusive
  reception is enabled (found under
  EDIT/SETUP/MIDI)
