D-10 Timbre / Timbre Bank
-------------------------

* Timbre - load a single Timbre
* Timbre Bank - load all 128 Timbres
* Roland Timbre data does NOT contain
  names but can be added using the
  'Fill Name' Bank Edit Function

* Match D-10 Unit # to Comm Ch 

WARNING: D-10 instruments with ROM
software versions less than 1.05
have MIDI SysX bugs and will not
work properly in many instances.

To obtain the ROM version hold down
the DATA TRANSFER and EDIT buttons
and turn on the instrument.

To replace ROMs, contact ROLAND or
your local dealer

