D-50 Patch / Patch Bank
-----------------------

* Patch - load a single Patch

* Patch Bank - load all 64 Patches

* MIDI Channel to Comm Ch (under MIDI)

* LOADING/SENDING A PATCH BANK

* To transfer a Patch Bank it is
  necessary to put the D-50/550
  in DATA TRANSFER mode.

* Press the DATA TRANSFER BUTTON

* If D-50->MQuest Press <Bulk Dump>
* If MQuest->D-50 Press <Bulk Load>

* Go to MIDI QUEST and perform the
  Bulk operation

