D-5 Effect / Effect Bank
------------------------

* Effect - load a single Effect

* Effect Bank - load all 64 Effects

* match UNIT# to Comm Ch (under MIDI)

* WARNING: some versions of the D-5 do
  not return Effect Bank data when the
  request is made from the documented
  location. If you are having problems
  with Effect banks, talk to Roland to
  determine whether you have the
  latest instrument ROM software
  version.

