Rhythm Temp - drum assignments in use
Rhythm Perm - drum assignments when
  instrument is turned on
Rhythm Pattern - all recorded rhythm
  patterns
Rhythm Track - the linked rhythms

* Match D-10 Unit # to Comm Ch 

WARNING: D-10 instruments with ROM
software versions less than 1.05
have MIDI SysX bugs and will not
work properly in many instances.

To obtain the ROM version hold down
the DATA TRANSFER and EDIT buttons
and turn on the instrument.

To replace ROMs, contact ROLAND or
your local dealer

