Matrix 1000 Global
------------------

* To store Global information

* The Matrix 1000 does NOT use a MIDI
  channel for SysX communication

* ECHO mode MUST be OFF (in 'Ext
  functions' or communication errors
  will result)

* On PC/XT - Sequencer MUST be off
  when requesting SysX data
