Ensoniq ESQ Sequence/Sequence.Lrg
---------------------------------

- Load the currently selected sequence

- Sequence - for Sequences < 20K
- Sequence.Lrg - for large sequences
  (132K byte buffer)

- Turn on SysX transmit/recv (every
  time the Synth is turned on)

- By selecting the MIDI button,
  and increasing the MIDI mode
  parameter to its maximum value
  (SX MUST be displayed)

- Match MIDI Channel (under the MIDI
  button) to the Driver List

- Use Driver Creator to optimize the
  buffer size

