Ensoniq ESQ AllSeq/AllSeq.Lrg
-----------------------------

- AllSeq - load all sequences with
  memory allocation

- AllSeq.Lrg - load all sequences
  with 131K memory allocation

- Turn on SysX transmit/recv (every
  time the Synth is turned on)

- By selecting the MIDI button,
  and increasing the MIDI mode
  parameter to its maximum value
  (SX MUST be displayed)

- Match MIDI Channel (under the MIDI
  button) to the Driver List

- Use Driver Creator to optimize the
  buffer size to your needs

