CZ Patch Bank
-------------
- Match MIDI Channel (under
  the MIDI button) to the
  Driver List

- Turn off memory protect
  before transmitting to
  CZ

- NO SEQUENCER operation
  during bulk transmission
  or during editing (an
  unfortunate limitation
  resulting from the way
  CASIO communicates SysX
  information)

- PC NOTE: reception of Casio data can
  be unreliable because the MPU must
  switch into UART mode and back.


