CZ Patch
--------
- Load/send 1 patch

- Match MIDI Channel (under the MIDI
  button) to the Driver List

- Turn off memory protect before
  transmitting to CZ

- Use Pch# to select the patch being
  received/transmitted

- NO SEQUENCER operation during bulk
  transmission or during editing (an
  unfortunate limitation resulting
  from the way CASIO communicates
  SysX information)

- PC NOTE: reception of Casio data can
  be unreliable because the MPU must
  switch into UART mode and back.
