                 Six-Trak XOR Profile

Due to limitations of the Six-Trak's MIDI implementation,
this profile must use program 99 as a temporary edit buffer.
PROGRAM 99 WILL BE OVERWRITTEN ANY TIME YOU EDIT A SOUND, SO
YOU SHOULD NOT STORE IMPORTANT SOUNDS THERE!

This profile expects the Six-Trak to be in single-timbral mode.
If you have XOR version 1.1 or higher, it will automatically
set the Six-Trak up properly when it boots. If you're using
version 1.0, you'll need to enable program changes and parameter
reception, and set the Six-Trak to Omni Off/Poly mode, each time
you power up.
 
