 KEYS: Function Keys

 F1   Moves into form-style view.
 F2   Copies a field from the
      previous record into the same
      field of the current record.
 F3   Verifies information and avoids
      duplication between a field in
      subsequent records.
 F4   Erases all information in the
      current record.
 F5   Re-calculates all calculations
      in the current data base.
 KEYS: Function Keys

 F6   Turns the column titles on/off.
 F7   Turns the column-style grid OR
      the form-style boxes on/off.
 F8   Stores the current record in
      memory.
 F9   Moves to the next record
      (form view only).
 F10  Moves to the previous record
      (form view only).


