Copilot Debugger Help -------------------------------------------------------
d [<address>] [l<count>]   Dump memory using previous type
da [<address>] [l<count>]  Dump memory ASCII
db [<address>] [l<count>]  Dump memory bytes
dd [<address>] [l<count>]  Dump memory double-words (longs)
dw [<address>] [l<count>]  Dump memory words
dh [-d] <handle>           Dump handle pointer, size (-d dumps data too)
ds                         Dump active module's symbols

bc <bpid>                  Clear breakpoint
bd <bpid>                  Disable breakpoint
be <bpid>                  Enable breakpoint
bl                         List breakpoint(s)
bp [-na] [<address>]       Set breakpoint (-na breaks at next app startup)

e <address> <value> [...]  Enter using previous type
ea <address> <value> [...] Enter ASCII
eb <address> <value> [...] Enter bytes
ed <address> <value> [...] Enter double-words
ew <address> <value> [...] Enter words

g [=<address>] [<address>] Start execution and stop when address is reached
*j <expr> ? "<true cmd list>" : "<false cmd list>"
k                          Stack backtrace
ln [<address>]             List closest symbols before and after address
p [=<address>] [<count>]   Execute an instruction (won't trace into JSR, etc)
r [<reg> <value>]          Dump or set registers
set [<var> [<value>]]      Dump, clear, or set a variable's value
t [=<address>] [<count>]   Trace an instruction
u [<address>] [l<count>]   Display unassembled instructions

*zd                         Run the default command
*zl                         List the default command
*zs "<cmd list>"            Set the default command

n [<radix>]                Show/set default number base (radix)

?, help                    Show this help
<Enter>                    Repeat the previous command

Legend ----------------------------------------------------------------------
<reg>
<address>
<value>
<range>                    [<address>] [l<expr>]
<expr>
<bpid>                     <id> | '*'
<cmd list>
<var>

Debugger Variables ----------------------------------------------------------
_NumLines (0-any):   Default number of lines dumped by 'u', 'd', etc commands
_BreakCmd ("cmd"):   Command executed after step, trace, or break into
                     debugger
_NextDump
_NextDisasm
