INPUT/OUTPUT MODE - F4 DEFAULTS                                 EZCHV016.HLP
═══════════════════════════════════════════════════════════════════════════════
    Data Path─Data drive and path where your files are to be read and saved.
     Dir Mask─The directory mask used to look up files when the space bar
              feature is used for File Name.

    Box Width─The figure width in columns.
   Box Height─The figure height in rows.
Move Scrn-L/R─The number of columns the screen moves when Ctrl-left or
              Ctrl-right is pressed.
Move Scrn-U/D─The number of rows the screen moves when Ctrl-PgUp or
              Ctrl-PgDn is pressed.

  -Compressed─If Y then EasyChart will print at 17 characters per inch.
  -Overstrike─If Y then EasyChart will print each line twice.
-Setup String─A string of code to be sent to the printer before printing the
              workspace.
-Line Numbers─If Y then the row number is printed to the left of each line.
 -Left Margin─The number of characters to leave blank before each line.
-Lines / Page─The number of lines that can print on a page of paper.

Color Monitor─This field is Y for yes if you have a color monitor, or N for
              no if you do not have a color monitor.
