INPUT/OUTPUT MODE                                               EZCHV002.HLP
═══════════════════════════════════════════════════════════════════════════════
 F2 Quit     exits EasyChart and returns to DOS.
    ────
 F3 Create-M enters Create Mode.
    ────────
 F4 Defaults brings up the Defaults Menu. The Defaults Menu allows
    ──────── changes to: Box Size; Screen Movement Increments;
             Data Path and Drive; Printer Settings; and Monitor Type.

 F5 Merge    merges a disk file into the workspace at the cursor position.
    ─────
 F6 Read     reads a disk file into the workspace.
    ────
 F7 Save     writes the workspace into a disk file.
    ────
 F8 Print    sends the workspace to the printer.
    ─────
 F9 Clr      erases the workspace. Clr in no way effects any file on the disk.
    ───
F10 OV       displays a condensed version of the workspace.
    ──
